1767145764967
890,0.64.8
620,0.64.8
5667,0.64.8
7282,0.64.8
8000,0.64.8
6243,0.64.8
13130,0.64.8
18434,0.64.8
7402,0.64.8
9179,0.64.8
5771,0.64.8
13529,0.64.8
17658,0.64.8
